Refractive index

68 languages

- Article

- Talk

- Read

- Edit

- View history

Tools

From Wikipedia, the free encyclopedia

refer to caption

A ray of light being refracted through a glass slab

In optics, the refractive index (or refraction index) of an optical medium is a dimensionless number that gives the indication of the light bending ability of that medium.

Illustration of the incidence and refraction angles

Refraction of a light ray

The refractive index determines how much the path of light is bent, or refracted, when entering a material. This is described by Snell's law of refraction, n1 sin θ1 = n2 sin θ2, where θ1 and θ2 are the angle of incidence and angle of refraction, respectively, of a ray crossing the interface between two media with refractive indices n1 and n2. The refractive indices also determine the amount of light that is reflected when reaching the interface, as well as the critical angle for total internal reflection, their intensity (Fresnel's equations) and Brewster's angle.[1]

The refractive index can be seen as the factor by which the speed and the wavelength of the radiation are reduced with respect to their vacuum values: the speed of light in a medium is v = c/n, and similarly the wavelength in that medium is λ = λ0/n, where λ0 is the wavelength of that light in vacuum. This implies that vacuum has a refractive index of 1, and assumes that the frequency (f = v/λ) of the wave is not affected by the refractive index.

The refractive index may vary with wavelength. This causes white light to split into constituent colors when refracted. This is called dispersion. This effect can be observed in prisms and rainbows, and as chromatic aberration in lenses. Light propagation in absorbing materials can be described using a complex-valued refractive index.[2] The imaginary part then handles the attenuation, while the real part accounts for refraction. For most materials the refractive index changes with wavelength by several percent across the visible spectrum. Nevertheless, refractive indices for materials are commonly reported using a single value for n, typically measured at 633 nm.

The concept of refractive index applies across the full electromagnetic spectrum, from X-rays to radio waves. It can also be applied to wave phenomena such as sound. In this case, the speed of sound is used instead of that of light, and a reference medium other than vacuum must be chosen.[3]

For lenses (such as eye glasses), a lens made from a high refractive index material will be thinner, and hence lighter, than a conventional lens with a lower refractive index. Such lenses are generally more expensive to manufacture than conventional ones.

Definition[edit]

The relative refractive index of an optical medium 2 with respect to another reference medium 1 (n21) is given by the ratio of speed of light in medium 1 to that in medium 2. This can be expressed as follows:

{\displaystyle n_{21}={\frac {v_{1}}{v_{2}}}.}

If the reference medium 1 is vacuum, then the refractive index of medium 2 is considered with respect to vacuum. It is simply represented as n2 and is called the absolute refractive index of medium 2.

The absolute refractive index n of an optical medium is defined as the ratio of the speed of light in vacuum, c = 299792458 m/s, and the phase velocity v of light in the medium,

n={\frac {c}{v}}.

Since c is constant, n is inversely proportional to v :

{\displaystyle n\propto {\frac {1}{v}}.}

The phase velocity is the speed at which the crests or the phase of the wave moves, which may be different from the group velocity, the speed at which the pulse of light or the envelope of the wave moves.[1] Historically air at a standardized pressure and temperature has been common as a reference medium.

History[edit]

Stipple engraving of Thomas Young

Thomas Young coined the term index of refraction.

Thomas Young was presumably the person who first used, and invented, the name "index of refraction", in 1807.[4] At the same time he changed this value of refractive power into a single number, instead of the traditional ratio of two numbers. The ratio had the disadvantage of different appearances. Newton, who called it the "proportion of the sines of incidence and refraction", wrote it as a ratio of two numbers, like "529 to 396" (or "nearly 4 to 3"; for water).[5] Hauksbee, who called it the "ratio of refraction", wrote it as a ratio with a fixed numerator, like "10000 to 7451.9" (for urine).[6] Hutton wrote it as a ratio with a fixed denominator, like 1.3358 to 1 (water).[7]

Young did not use a symbol for the index of refraction, in 1807. In the later years, others started using different symbols: n, m, and µ.[8][9][10] The symbol n gradually prevailed.

Typical values[edit]

See also: List of refractive indices

Gemstone diamonds

Diamonds have a very high refractive index of 2.417.

Refractive index also varies with wavelength of the light as given by Cauchy's equation:

The most general form of Cauchy's equation is

{\displaystyle n(\lambda )=A+{\frac {B}{\lambda ^{2}}}+{\frac {C}{\lambda ^{4}}}+\cdots ,}

where n is the refractive index, λ is the wavelength, A, B, C, etc., are coefficients that can be determined for a material by fitting the equation to measured refractive indices at known wavelengths. The coefficients are usually quoted for λ as the vacuum wavelength in micrometres.

Usually, it is sufficient to use a two-term form of the equation:

{\displaystyle n(\lambda )=A+{\frac {B}{\lambda ^{2}}},}

where the coefficients A and B are determined specifically for this form of the equation.

Selected refractive indices at λ=589 nm. For references, see the extended List of refractive indices.

Material

n

Vacuum

1

Gases at 0 °C and 1 atm

Air

1.000293

Helium

1.000036

Hydrogen

1.000132

Carbon dioxide

1.00045

Liquids at 20 °C

Water

1.333

Ethanol

1.36

Olive oil

1.47

Solids

Ice

1.31

Fused silica (quartz)

1.46[11]

PMMA (acrylic, plexiglas, lucite, perspex)

1.49

Window glass

1.52[12]

Polycarbonate (Lexan™)

1.58[13]

Flint glass (typical)

1.69

Sapphire

1.77[14]

Cubic zirconia

2.15

Diamond

2.417

Moissanite

2.65

For visible light most transparent media have refractive indices between 1 and 2. A few examples are given in the adjacent table. These values are measured at the yellow doublet D-line of sodium, with a wavelength of 589 nanometers, as is conventionally done.[15] Gases at atmospheric pressure have refractive indices close to 1 because of their low density. Almost all solids and liquids have refractive indices above 1.3, with aerogel as the clear exception. Aerogel is a very low density solid that can be produced with refractive index in the range from 1.002 to 1.265.[16] Moissanite lies at the other end of the range with a refractive index as high as 2.65. Most plastics have refractive indices in the range from 1.3 to 1.7, but some high-refractive-index polymers can have values as high as 1.76.[17]

For infrared light refractive indices can be considerably higher. Germanium is transparent in the wavelength region from 2 to 14 µm and has a refractive index of about 4.[18] A type of new materials termed "topological insulators", was recently found which have high refractive index of up to 6 in the near to mid infrared frequency range. Moreover, topological insulators are transparent when they have nanoscale thickness. These properties are potentially important for applications in infrared optics.[19]

Refractive index below unity[edit]

According to the theory of relativity, no information can travel faster than the speed of light in vacuum, but this does not mean that the refractive index cannot be less than 1. The refractive index measures the phase velocity of light, which does not carry information.[20][a] The phase velocity is the speed at which the crests of the wave move and can be faster than the speed of light in vacuum, and thereby give a refractive index below 1 . This can occur close to resonance frequencies, for absorbing media, in plasmas, and for X-rays. In the X-ray regime the refractive indices are lower than but very close to 1 (exceptions close to some resonance frequencies).[21] As an example, water has a refractive index of 0.99999974 = 1 − 2.6×10−7 for X-ray radiation at a photon energy of 30 keV (0.04 nm wavelength).[21]

An example of a plasma with an index of refraction less than unity is Earth's ionosphere. Since the refractive index of the ionosphere (a plasma), is less than unity, electromagnetic waves propagating through the plasma are bent "away from the normal" (see Geometric optics) allowing the radio wave to be refracted back toward earth, thus enabling long-distance radio communications. See also Radio Propagation and Skywave.[22]

Negative refractive index[edit]

See also: Negative index metamaterials

A 3D grid of open copper rings made from interlocking standing sheets of fiberglass circuit boards

A split-ring resonator array arranged to produce a negative index of refraction for microwaves

Recent research has also demonstrated the existence of materials with a negative refractive index, which can occur if permittivity and permeability have simultaneous negative values.[23] This can be achieved with periodically constructed metamaterials. The resulting negative refraction (i.e., a reversal of Snell's law) offers the possibility of the superlens and other new phenomena to be actively developed by means of metamaterials.[24][25]

Microscopic explanation[edit]

In optical mineralogy, thin sections are used to study rocks. The method is based on the distinct refractive indices of different minerals.

Main article: Ewald–Oseen extinction theorem

At the atomic scale, an electromagnetic wave's phase velocity is slowed in a material because the electric field creates a disturbance in the charges of each atom (primarily the electrons) proportional to the electric susceptibility of the medium. (Similarly, the magnetic field creates a disturbance proportional to the magnetic susceptibility.) As the electromagnetic fields oscillate in the wave, the charges in the material will be "shaken" back and forth at the same frequency.[1]: 67  The charges thus radiate their own electromagnetic wave that is at the same frequency, but usually with a phase delay, as the charges may move out of phase with the force driving them (see sinusoidally driven harmonic oscillator). The light wave traveling in the medium is the macroscopic superposition (sum) of all such contributions in the material: the original wave plus the waves radiated by all the moving charges. This wave is typically a wave with the same frequency but shorter wavelength than the original, leading to a slowing of the wave's phase velocity. Most of the radiation from oscillating material charges will modify the incoming wave, changing its velocity. However, some net energy will be radiated in other directions or even at other frequencies (see scattering).

Depending on the relative phase of the original driving wave and the waves radiated by the charge motion, there are several possibilities:

- If the electrons emit a light wave which is 90° out of phase with the light wave shaking them, it will cause the total light wave to travel slower. This is the normal refraction of transparent materials like glass or water, and corresponds to a refractive index which is real and greater than 1.[26]

- If the electrons emit a light wave which is 270° out of phase with the light wave shaking them, it will cause the wave to travel faster. This is called "anomalous refraction", and is observed close to absorption lines (typically in infrared spectra), with X-rays in ordinary materials, and with radio waves in Earth's ionosphere. It corresponds to a permittivity less than 1, which causes the refractive index to be also less than unity and the phase velocity of light greater than the speed of light in vacuum c (note that the signal velocity is still less than c, as discussed above). If the response is sufficiently strong and out-of-phase, the result is a negative value of permittivity and imaginary index of refraction, as observed in metals or plasma.[26]

- If the electrons emit a light wave which is 180° out of phase with the light wave shaking them, it will destructively interfere with the original light to reduce the total light intensity. This is light absorption in opaque materials and corresponds to an imaginary refractive index.

- If the electrons emit a light wave which is in phase with the light wave shaking them, it will amplify the light wave. This is rare, but occurs in lasers due to stimulated emission. It corresponds to an imaginary index of refraction, with the opposite sign to that of absorption.

For most materials at visible-light frequencies, the phase is somewhere between 90° and 180°, corresponding to a combination of both refraction and absorption.

Dispersion[edit]

A rainbow

Light of different colors has slightly different refractive indices in water and therefore shows up at different positions in the rainbow.

A white beam of light dispersed into different colors when passing through a triangular prism

In a prism, dispersion causes different colors to refract at different angles, splitting white light into a rainbow of colors.

A graph showing the decrease in refractive index with increasing wavelength for different types of glass

The variation of refractive index with wavelength for various glasses. The shaded zone indicates the range of visible light.

Main article: Dispersion (optics)

The refractive index of materials varies with the wavelength (and frequency) of light.[27] This is called dispersion and causes prisms and rainbows to divide white light into its constituent spectral colors.[28] As the refractive index varies with wavelength, so will the refraction angle as light goes from one material to another. Dispersion also causes the focal length of lenses to be wavelength dependent. This is a type of chromatic aberration, which often needs to be corrected for in imaging systems. In regions of the spectrum where the material does not absorb light, the refractive index tends to decrease with increasing wavelength, and thus increase with frequency. This is called "normal dispersion", in contrast to "anomalous dispersion", where the refractive index increases with wavelength.[27] For visible light normal dispersion means that the refractive index is higher for blue light than for red.

For optics in the visual range, the amount of dispersion of a lens material is often quantified by the Abbe number:[28]

V={\frac {n_{\mathrm {yellow} }-1}{n_{\mathrm {blue} }-n_{\mathrm {red} }}}.

For a more accurate description of the wavelength dependence of the refractive index, the Sellmeier equation can be used.[29] It is an empirical formula that works well in describing dispersion. Sellmeier coefficients are often quoted instead of the refractive index in tables.

Principal refractive index wavelength ambiguity[edit]

Because of dispersion, it is usually important to specify the vacuum wavelength of light for which a refractive index is measured. Typically, measurements are done at various well-defined spectral emission lines.

Manufacturers of optical glass in general define principal index of refraction at yellow spectral line of helium (587.56 nm) and alternatively at a green spectral line of mercury (546.07 nm), called d and e lines respectively. Abbe number is defined for both and denoted Vd and Ve. The spectral data provided by glass manufacturers is also often more precise for these 2 wavelengths.[30][31][32][33]

Both, d and e spectral lines are singlets and thus are suitable to perform a very precise measurements, such as spectral goniometric method.[34][35]

In practical applications, measurements of refractive index are performed on various refractometers, such as Abbe refractometer. Measurement accuracy of such typical commercial devices is in the order of 0.0002.[36][37] Refractometers usually measure refractive index nD, defined for sodium doublet D (589.29 nm), which is actually a midpoint between 2 adjacent yellow spectral lines of sodium. Yellow spectral lines of helium (d) and sodium (D) are 1.73 nm apart, which can be considered negligible for typical refractometers, but can cause confusion and lead to errors if accuracy is critical.

All 3 typical principle refractive indices definitions can be found depending on application and region,[38] so a proper subscript should be used to avoid ambiguity.

Complex refractive index[edit]

See also: Mathematical descriptions of opacity

When light passes through a medium, some part of it will always be absorbed. This can be conveniently taken into account by defining a complex refractive index,

{\underline {n}}=n+i\kappa .

Here, the real part n is the refractive index and indicates the phase velocity, while the imaginary part κ is called the optical extinction coefficient or absorption coefficient—although κ can also refer to the mass attenuation coefficient[39]: 3 —and indicates the amount of attenuation when the electromagnetic wave propagates through the material.[1]: 128

That κ corresponds to absorption can be seen by inserting this refractive index into the expression for electric field of a plane electromagnetic wave traveling in the x-direction. This can be done by relating the complex wave number k to the complex refractive index n through k = 2πn/λ0, with λ0 being the vacuum wavelength; this can be inserted into the plane wave expression for a wave travelling in the x direction as:

{\displaystyle \mathbf {E} (s,t)=\operatorname {Re} \!\left[\mathbf {E} _{0}e^{i({\underline {k}}x-\omega t)}\right]=\operatorname {Re} \!\left[\mathbf {E} _{0}e^{i(2\pi (n+i\kappa )x/\lambda _{0}-\omega t)}\right]=e^{-2\pi \kappa x/\lambda _{0}}\operatorname {Re} \!\left[\mathbf {E} _{0}e^{i(kx-\omega t)}\right].}

Here we see that κ gives an exponential decay, as expected from the Beer–Lambert law. Since intensity is proportional to the square of the electric field, intensity will depend on the depth into the material as

{\displaystyle I(x)=I_{0}e^{-4\pi \kappa x/\lambda _{0}}.}

and thus the absorption coefficient is α = 4πκ/λ0,[1]: 128  and the penetration depth (the distance after which the intensity is reduced by a factor of 1/e) is δp = 1/α = λ0/4πκ.

Both n and κ are dependent on the frequency. In most circumstances κ > 0 (light is absorbed) or κ = 0 (light travels forever without loss). In special situations, especially in the gain medium of lasers, it is also possible that κ < 0, corresponding to an amplification of the light.

An alternative convention uses n = n + iκ instead of n = n − iκ, but where κ > 0 still corresponds to loss. Therefore, these two conventions are inconsistent and should not be confused. The difference is related to defining sinusoidal time dependence as Re[exp(−iωt)] versus Re[exp(+iωt)]. See Mathematical descriptions of opacity.

Dielectric loss and non-zero DC conductivity in materials cause absorption. Good dielectric materials such as glass have extremely low DC conductivity, and at low frequencies the dielectric loss is also negligible, resulting in almost no absorption. However, at higher frequencies (such as visible light), dielectric loss may increase absorption significantly, reducing the material's transparency to these frequencies.

The real, n, and imaginary, κ, parts of the complex refractive index are related through the Kramers–Kronig relations. In 1986 A.R. Forouhi and I. Bloomer deduced an equation describing κ as a function of photon energy, E, applicable to amorphous materials. Forouhi and Bloomer then applied the Kramers–Kronig relation to derive the corresponding equation for n as a function of E. The same formalism was applied to crystalline materials by Forouhi and Bloomer in 1988.

The refractive index and extinction coefficient, n and κ, are typically measured from quantities that depend on them, such as reflectance, R, or transmittance, T, or ellipsometric parameters, ψ and δ. The determination of n and κ from such measured quantities will involve developing a theoretical expression for R or T, or ψ and δ in terms of a valid physical model for n and κ. By fitting the theoretical model to the measured R or T, or ψ and δ using regression analysis, n and κ can be deduced.

X-ray and extreme UV[edit]

For X-ray and extreme ultraviolet radiation the complex refractive index deviates only slightly from unity and usually has a real part smaller than 1. It is therefore normally written as n = 1 − δ + iβ (or n = 1 − δ − iβ with the alternative convention mentioned above).[2] Far above the atomic resonance frequency delta can be given by

{\displaystyle \delta ={\frac {r_{0}\lambda ^{2}n_{e}}{2\pi }}}

where

r_{0} is the classical electron radius,

\lambda  is the X-ray wavelength, and

n_{e} is the electron density. One may assume the electron density is simply the number of electrons per atom Z multiplied by the atomic density, but more accurate calculation of the refractive index requires replacing Z with the complex atomic form factor

{\displaystyle f=Z+f'+if''}. It follows that

{\displaystyle \delta ={\frac {r_{0}\lambda ^{2}}{2\pi }}(Z+f')n_{\text{atom}}}

{\displaystyle \beta ={\frac {r_{0}\lambda ^{2}}{2\pi }}f''n_{\text{atom}}}

\beta  typically of the order of 10−5 and 10−6.

Relations to other quantities[edit]

Optical path length[edit]

Soap bubble

The colors of a soap bubble are determined by the optical path length through the thin soap film in a phenomenon called thin-film interference.

Optical path length (OPL) is the product of the geometric length d of the path light follows through a system, and the index of refraction of the medium through which it propagates,[40]

{\text{OPL}}=nd.

This is an important concept in optics because it determines the phase of the light and governs interference and diffraction of light as it propagates. According to Fermat's principle, light rays can be characterized as those curves that optimize the optical path length.[1]: 68–69

Refraction[edit]

Main article: Refraction

refer to caption

Refraction of light at the interface between two media of different refractive indices, with n2 > n1. Since the phase velocity is lower in the second medium (v2 < v1), the angle of refraction θ2 is less than the angle of incidence θ1; that is, the ray in the higher-index medium is closer to the normal.

When light moves from one medium to another, it changes direction, i.e. it is refracted. If it moves from a medium with refractive index n1 to one with refractive index n2, with an incidence angle to the surface normal of θ1, the refraction angle θ2 can be calculated from Snell's law:[41]

n_{1}\sin \theta _{1}=n_{2}\sin \theta _{2}.

When light enters a material with higher refractive index, the angle of refraction will be smaller than the angle of incidence and the light will be refracted towards the normal of the surface. The higher the refractive index, the closer to the normal direction the light will travel. When passing into a medium with lower refractive index, the light will instead be refracted away from the normal, towards the surface.

Total internal reflection[edit]

Main article: Total internal reflection

A sea turtle being reflected in the water surface above

Total internal reflection can be seen at the air-water boundary.

If there is no angle θ2 fulfilling Snell's law, i.e.,

{\frac {n_{1}}{n_{2}}}\sin \theta _{1}>1,

the light cannot be transmitted and will instead undergo total internal reflection.[42]: 49–50  This occurs only when going to a less optically dense material, i.e., one with lower refractive index. To get total internal reflection the angles of incidence θ1 must be larger than the critical angle[43]

\theta _{\mathrm {c} }=\arcsin \!\left({\frac {n_{2}}{n_{1}}}\right)\!.

Reflectivity[edit]

Apart from the transmitted light there is also a reflected part. The reflection angle is equal to the incidence angle, and the amount of light that is reflected is determined by the reflectivity of the surface. The reflectivity can be calculated from the refractive index and the incidence angle with the Fresnel equations, which for normal incidence reduces to[42]: 44

R_{0}=\left|{\frac {n_{1}-n_{2}}{n_{1}+n_{2}}}\right|^{2}\!.

For common glass in air,   n1 = 1   and   n2 = 1.5  , and thus about 4% of the incident power is reflected.[44] At other incidence angles the reflectivity will also depend on the polarization of the incoming light. At a certain angle called Brewster's angle, p-polarized light (light with the electric field in the plane of incidence) will be totally transmitted. Brewster's angle can be calculated from the two refractive indices of the interface as [1]: 245

{\displaystyle \theta _{\mathsf {B}}=\arctan \left({\frac {\ n_{2}\ }{n_{1}}}\right)~.}

Lenses[edit]

A magnifying glass

The power of a magnifying glass is determined by the shape and refractive index of the lens.

The focal length of a lens is determined by its refractive index n and the radii of curvature R1 and R2 of its surfaces. The power of a thin lens in air is given by the simplified version of the Lensmaker's formula:[45]

{\displaystyle {\frac {1}{\ f\ }}=(n-1)\ \left[{\frac {1}{\ R_{1}\ }}-{\frac {1}{\ R_{2}\ }}\right]\ ,}

where f  is the focal length of the lens.

Microscope resolution[edit]

The resolution of a good optical microscope is mainly determined by the numerical aperture (ANum) of its objective lens. The numerical aperture in turn is determined by the refractive index n of the medium filling the space between the sample and the lens and the half collection angle of light θ according to Carlsson (2007):[46]: 6

{\displaystyle A_{\mathsf {Num}}=n\sin \theta ~.}

For this reason oil immersion is commonly used to obtain high resolution in microscopy. In this technique the objective is dipped into a drop of high refractive index immersion oil on the sample under study.[46]: 14

Relative permittivity and permeability[edit]

The refractive index of electromagnetic radiation equals

n={\sqrt {\varepsilon _{\mathrm {r} }\mu _{\mathrm {r} }}},

where εr is the material's relative permittivity, and μr is its relative permeability.[47]: 229  The refractive index is used for optics in Fresnel equations and Snell's law; while the relative permittivity and permeability are used in Maxwell's equations and electronics. Most naturally occurring materials are non-magnetic at optical frequencies, that is μr is very close to 1, therefore n is approximately √εr.[48] In this particular case, the complex relative permittivity εr, with real and imaginary parts εr and ɛ̃r, and the complex refractive index n, with real and imaginary parts n and κ (the latter called the "extinction coefficient"), follow the relation

{\underline {\varepsilon }}_{\mathrm {r} }=\varepsilon _{\mathrm {r} }+i{\tilde {\varepsilon }}_{\mathrm {r} }={\underline {n}}^{2}=(n+i\kappa )^{2},

and their components are related by:[49]

\varepsilon _{\mathrm {r} }=n^{2}-\kappa ^{2},

{\tilde {\varepsilon }}_{\mathrm {r} }=2n\kappa ,

and:

n={\sqrt {\frac {|{\underline {\varepsilon }}_{\mathrm {r} }|+\varepsilon _{\mathrm {r} }}{2}}},

\kappa ={\sqrt {\frac {|{\underline {\varepsilon }}_{\mathrm {r} }|-\varepsilon _{\mathrm {r} }}{2}}}.

where

|{\underline {\varepsilon }}_{\mathrm {r} }|={\sqrt {\varepsilon _{\mathrm {r} }^{2}+{\tilde {\varepsilon }}_{\mathrm {r} }^{2}}} is the complex modulus.

Wave impedance[edit]

See also: Wave impedance

The wave impedance of a plane electromagnetic wave in a non-conductive medium is given by

{\displaystyle \ Z\ =\ {\sqrt {{\frac {\ \mu \ }{\varepsilon }}\ }}\ =\ {\sqrt {{\frac {\ \mu _{\mathrm {0} }\mu _{\mathrm {r} }\ }{\varepsilon _{\mathrm {0} }\varepsilon _{\mathrm {r} }}}\ }}\ =\ {\sqrt {{\frac {\ \mu _{\mathrm {0} }\ }{\varepsilon _{\mathrm {0} }}}\ }}\ {\sqrt {{\frac {\ \mu _{\mathrm {r} }\ }{\varepsilon _{\mathrm {r} }}}\ }}\ =\ Z_{0}\ {\sqrt {{\frac {\ \mu _{\mathrm {r} }\ }{\varepsilon _{\mathrm {r} }}}\ }}\ =\ Z_{0}\ {\frac {\ \mu _{\mathrm {r} }\ }{n}}~.}

where

{\displaystyle \ Z_{0}\ } is the vacuum wave impedance, μ and ε are the absolute permeability and permittivity of the medium, εr is the material's relative permittivity, and μr is its relative permeability.

{\displaystyle \ \mu _{\mathrm {r} }=1\ })

{\displaystyle \ Z={\frac {\ Z_{0}\ }{n}}\quad } and

{\displaystyle \quad n={\frac {\ Z_{0}\ }{Z}}~.}

Thus refractive index in a non-magnetic media is the ratio of the vacuum wave impedance to the wave impedance of the medium.

{\displaystyle \ R_{0}\ } between two media can thus be expressed both by the wave impedances and the refractive indices as

{\displaystyle \ R_{0}=\left|{\frac {\ n_{1}-n_{2}\ }{n_{1}+n_{2}}}\right|^{2}=\left|{\frac {\ Z_{2}-Z_{1}\ }{Z_{2}+Z_{1}}}\right|^{2}~.}

Density[edit]

A scatter plot showing a strong correlation between glass density and refractive index for different glasses

The relation between the refractive index and the density of silicate and borosilicate glasses[50]

In general, the refractive index of a glass increases with its density. However, there does not exist an overall linear relationship between the refractive index and the density for all silicate and borosilicate glasses. A relatively high refractive index and low density can be obtained with glasses containing light metal oxides such as Li2O and MgO, while the opposite trend is observed with glasses containing PbO and BaO as seen in the diagram at the right.

Many oils (such as olive oil) and ethanol are examples of liquids that are more refractive, but less dense, than water, contrary to the general correlation between density and refractive index.

For air, n − 1 is proportional to the density of the gas as long as the chemical composition does not change.[51] This means that it is also proportional to the pressure and inversely proportional to the temperature for ideal gases.

Group index[edit]

Sometimes, a "group velocity refractive index", usually called the group index is defined:[citation needed]

n_{\mathrm {g} }={\frac {\mathrm {c} }{v_{\mathrm {g} }}},

where vg is the group velocity. This value should not be confused with n, which is always defined with respect to the phase velocity. When the dispersion is small, the group velocity can be linked to the phase velocity by the relation[42]: 22

v_{\mathrm {g} }=v-\lambda {\frac {\mathrm {d} v}{\mathrm {d} \lambda }},

where λ is the wavelength in the medium. In this case the group index can thus be written in terms of the wavelength dependence of the refractive index as

n_{\mathrm {g} }={\frac {n}{1+{\frac {\lambda }{n}}{\frac {\mathrm {d} n}{\mathrm {d} \lambda }}}}.

When the refractive index of a medium is known as a function of the vacuum wavelength (instead of the wavelength in the medium), the corresponding expressions for the group velocity and index are (for all values of dispersion)[52]

v_{\mathrm {g} }=\mathrm {c} \!\left(n-\lambda _{0}{\frac {\mathrm {d} n}{\mathrm {d} \lambda _{0}}}\right)^{-1}\!,

n_{\mathrm {g} }=n-\lambda _{0}{\frac {\mathrm {d} n}{\mathrm {d} \lambda _{0}}},

where λ0 is the wavelength in vacuum.

Other relations[edit]

As shown in the Fizeau experiment, when light is transmitted through a moving medium, its speed relative to an observer traveling with speed v in the same direction as the light is:

{\displaystyle \ V\ =\ {\frac {\mathrm {c} }{\ n\ }}+{\frac {\ v\left(1-{\frac {1}{\ n^{2}}}\right)\ }{1+{\frac {v}{\ cn\ }}}}~\approx ~{\frac {\mathrm {c} }{\ n\ }}+v\ \left(1-{\frac {1}{\ n^{2}}}\right)~.}

The refractive index of a substance can be related to its polarizability with the Lorentz–Lorenz equation or to the molar refractivities of its constituents by the Gladstone–Dale relation.

Refractivity[edit]

In atmospheric applications, refractivity is defined as N = n – 1 , often rescaled as either[53] N = 106 (n – 1) [54][55] or N = 108 (n – 1)  ;[56] the multiplication factors are used because the refractive index for air, n deviates from unity by at most a few parts per ten thousand.

Molar refractivity, on the other hand, is a measure of the total polarizability of a mole of a substance and can be calculated from the refractive index as

{\displaystyle A={\frac {\ M\ }{\rho }}\cdot {\frac {n^{2}-1}{\ n^{2}+2\ }}\ ,}

where ρ is the density, and M is the molar mass.[42]: 93

Nonscalar, nonlinear, or nonhomogeneous refraction[edit]

So far, we have assumed that refraction is given by linear equations involving a spatially constant, scalar refractive index. These assumptions can break down in different ways, to be described in the following subsections.

Birefringence[edit]

Main article: Birefringence

A crystal giving a double image of the text behind it

A calcite crystal laid upon a paper with some letters showing double refraction

A transparent plastic protractor with smoothly varying bright colors

Birefringent materials can give rise to colors when placed between crossed polarizers. This is the basis for photoelasticity.

In some materials, the refractive index depends on the polarization and propagation direction of the light.[57] This is called birefringence or optical anisotropy.

In the simplest form, uniaxial birefringence, there is only one special direction in the material. This axis is known as the optical axis of the material.[1]: 230  Light with linear polarization perpendicular to this axis will experience an ordinary refractive index no while light polarized in parallel will experience an extraordinary refractive index ne.[1]: 236  The birefringence of the material is the difference between these indices of refraction, Δn = ne − no.[1]: 237  Light propagating in the direction of the optical axis will not be affected by the birefringence since the refractive index will be no independent of polarization. For other propagation directions the light will split into two linearly polarized beams. For light traveling perpendicularly to the optical axis the beams will have the same direction.[1]: 233  This can be used to change the polarization direction of linearly polarized light or to convert between linear, circular, and elliptical polarizations with waveplates.[1]: 237

Many crystals are naturally birefringent, but isotropic materials such as plastics and glass can also often be made birefringent by introducing a preferred direction through, e.g., an external force or electric field. This effect is called photoelasticity, and can be used to reveal stresses in structures. The birefringent material is placed between crossed polarizers. A change in birefringence alters the polarization and thereby the fraction of light that is transmitted through the second polarizer.

In the more general case of trirefringent materials described by the field of crystal optics, the dielectric constant is a rank-2 tensor (a 3 by 3 matrix). In this case the propagation of light cannot simply be described by refractive indices except for polarizations along principal axes.

Nonlinearity[edit]

Main article: Nonlinear optics

The strong electric field of high intensity light (such as the output of a laser) may cause a medium's refractive index to vary as the light passes through it, giving rise to nonlinear optics.[1]: 502  If the index varies quadratically with the field (linearly with the intensity), it is called the optical Kerr effect and causes phenomena such as self-focusing and self-phase modulation.[1]: 264  If the index varies linearly with the field (a nontrivial linear coefficient is only possible in materials that do not possess inversion symmetry), it is known as the Pockels effect.[1]: 265

Inhomogeneity[edit]

Illustration with gradually bending rays of light in a thick slab of glass

A gradient-index lens with a parabolic variation of refractive index (n) with radial distance (x). The lens focuses light in the same way as a conventional lens.

If the refractive index of a medium is not constant but varies gradually with the position, the material is known as a gradient-index or GRIN medium and is described by gradient index optics.[1]: 273  Light traveling through such a medium can be bent or focused, and this effect can be exploited to produce lenses, some optical fibers, and other devices. Introducing GRIN elements in the design of an optical system can greatly simplify the system, reducing the number of elements by as much as a third while maintaining overall performance.[1]: 276  The crystalline lens of the human eye is an example of a GRIN lens with a refractive index varying from about 1.406 in the inner core to approximately 1.386 at the less dense cortex.[1]: 203  Some common mirages are caused by a spatially varying refractive index of air.

Refractive index measurement[edit]

Homogeneous media[edit]

Main articles: Refractometry and Refractometer

Illustration of a refractometer measuring the refraction angle of light passing from a sample into a prism along the interface

The principle of many refractometers

The refractive index of liquids or solids can be measured with refractometers. They typically measure some angle of refraction or the critical angle for total internal reflection. The first laboratory refractometers sold commercially were developed by Ernst Abbe in the late 19th century.[58] The same principles are still used today. In this instrument, a thin layer of the liquid to be measured is placed between two prisms. Light is shone through the liquid at incidence angles all the way up to 90°, i.e., light rays parallel to the surface. The second prism should have an index of refraction higher than that of the liquid, so that light only enters the prism at angles smaller than the critical angle for total reflection. This angle can then be measured either by looking through a telescope,[clarification needed] or with a digital photodetector placed in the focal plane of a lens. The refractive index n of the liquid can then be calculated from the maximum transmission angle θ as n = nG sin θ, where nG is the refractive index of the prism.[59]

A small cylindrical refractometer with a surface for the sample at one end and an eye piece to look into at the other end

A handheld refractometer used to measure the sugar content of fruits

This type of device is commonly used in chemical laboratories for identification of substances and for quality control. Handheld variants are used in agriculture by, e.g., wine makers to determine sugar content in grape juice, and inline process refractometers are used in, e.g., chemical and pharmaceutical industry for process control.

In gemology, a different type of refractometer is used to measure the index of refraction and birefringence of gemstones. The gem is placed on a high refractive index prism and illuminated from below. A high refractive index contact liquid is used to achieve optical contact between the gem and the prism. At small incidence angles most of the light will be transmitted into the gem, but at high angles total internal reflection will occur in the prism. The critical angle is normally measured by looking through a telescope.[60]

Refractive index variations[edit]

Main article: Phase-contrast imaging

Yeast cells with dark borders to the upper left and bright borders to lower right

A differential interference contrast microscopy image of yeast cells

Unstained biological structures appear mostly transparent under Bright-field microscopy as most cellular structures do not attenuate appreciable quantities of light. Nevertheless, the variation in the materials that constitute these structures also corresponds to a variation in the refractive index. The following techniques convert such variation into measurable amplitude differences:

To measure the spatial variation of the refractive index in a sample phase-contrast imaging methods are used. These methods measure the variations in phase of the light wave exiting the sample. The phase is proportional to the optical path length the light ray has traversed, and thus gives a measure of the integral of the refractive index along the ray path. The phase cannot be measured directly at optical or higher frequencies, and therefore needs to be converted into intensity by interference with a reference beam. In the visual spectrum this is done using Zernike phase-contrast microscopy, differential interference contrast microscopy (DIC), or interferometry.

Zernike phase-contrast microscopy introduces a phase shift to the low spatial frequency components of the image with a phase-shifting annulus in the Fourier plane of the sample, so that high-spatial-frequency parts of the image can interfere with the low-frequency reference beam. In DIC the illumination is split up into two beams that are given different polarizations, are phase shifted differently, and are shifted transversely with slightly different amounts. After the specimen, the two parts are made to interfere, giving an image of the derivative of the optical path length in the direction of the difference in the transverse shift.[46] In interferometry the illumination is split up into two beams by a partially reflective mirror. One of the beams is let through the sample before they are combined to interfere and give a direct image of the phase shifts. If the optical path length variations are more than a wavelength the image will contain fringes.

There exist several phase-contrast X-ray imaging techniques to determine 2D or 3D spatial distribution of refractive index of samples in the X-ray regime.[61]

Applications[edit]

This section does not cite any sources. Please help improve this section by adding citations to reliable sources. Unsourced material may be challenged and removed. (September 2014) (Learn how and when to remove this template message)

The refractive index is an important property of the components of any optical instrument. It determines the focusing power of lenses, the dispersive power of prisms, the reflectivity of lens coatings, and the light-guiding nature of optical fiber. Since the refractive index is a fundamental physical property of a substance, it is often used to identify a particular substance, confirm its purity, or measure its concentration. The refractive index is used to measure solids, liquids, and gases. Most commonly it is used to measure the concentration of a solute in an aqueous solution. It can also be used as a useful tool to differentiate between different types of gemstone, due to the unique chatoyance each individual stone displays. A refractometer is the instrument used to measure the refractive index. For a solution of sugar, the refractive index can be used to determine the sugar content (see Brix).

Footnotes[edit]

1. ^ One consequence of the real part of n being less than unity is that it implies that the phase velocity inside the material, c

/

n  , is larger than the velocity of light, c . This does not, however, violate the law of relativity, which requires that only signals carrying information do not travel faster than c . Such signals move with the group velocity, not with the phase velocity, and it can be shown that the group velocity is in fact less than c .[20]

See also[edit]

- Fermat's principle

- Calculation of glass properties

- Clausius–Mossotti relation

- Ellipsometry

- Index-matching material

- Index ellipsoid

- Laser Schlieren Deflectometry

- Optical properties of water and ice

- Prism-coupling refractometry

- Phase-contrast X-ray imaging

- Velocity factor